From ee4ea4266b2eae7a78680a722054a68a83840ec5 Mon Sep 17 00:00:00 2001
From: Michael Giacomelli <giac2000@hotmail.com>
Date: Tue, 14 Dec 2010 21:12:33 +0000
Subject: Make it more clear that key lock is our software hold switch
 function.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@28832 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index 7ca54d0142..c854b8a974 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -111,7 +111,7 @@ your WPS (While Playing Screen).
           \opt{PLAYER_PAD}{\ButtonMenu+\ButtonStop}
           \opt{ONDIO_PAD}{\ButtonMenu+\ButtonDown}
           \opt{SANSA_CLIP_PAD}{\ButtonHome+\ButtonSelect}
-          & Key lock on/off.\\
+          & Key lock (software hold switch) on/off.\\
       }%
       %These actions need definitions for the other targets
       \opt{RECORDER_PAD}{%
-- 
cgit v1.2.3

