From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index fedd5e156e..b233f08020 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -205,8 +205,8 @@ function in the \setting{File Context Menu}.
   The \setting{Pitch Screen} allows you to change the pitch and (at the same
   time) the playback speed of your \dap. The pitch value can be adjusted
   between 50\% and 200\%. 50\% means half the normal playback speed and the
-  pitch that's an octave lower than the normal pitch. 200\% means double
-  playback speed and the pitch that's an octave higher than the normal pitch.
+  pitch that is an octave lower than the normal pitch. 200\% means double
+  playback speed and the pitch that is an octave higher than the normal pitch.
   It is not possible to change the pitch without changing the playback speed and
   vice versa. Changing the pitch can be done in two modes: procentual and
   semitone. Initially (after the \dap{} is switched on), procentual mode
-- 
cgit v1.2.3

