From b530de0fd914483f9480cf0661bed5c3b6bd6f06 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Tue, 17 Oct 2006 11:28:36 +0000
Subject: Fix some missing/bad references

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@11245 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index 039911b4b4..45f30a8dfd 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -111,8 +111,11 @@ your WPS (While Playing Screen).
 \opt{HAVE_LCD_BITMAP}{
   \subsection{\label{ref:peak_meter}Peak Meter}
   The peak meter can be displayed on the While Playing Screen and consists of
-  several indicators.  For a picture of the peak meter, please see the While
-  Recording Screen in \reference{ref:Whilerecordingscreen}.
+  several indicators. 
+  \opt{HAVE_RECORDING}{
+    For a picture of the peak meter, please see the While
+    Recording Screen in \reference{ref:while_recording_screen}.
+  }
   
   \begin{description}
   \item [The bar:]
-- 
cgit v1.2.3

