From 2e45ca37ce287b05db12a41e5f81467e7f9e3d2a Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sat, 29 Mar 2008 01:11:12 +0000
Subject: Manuals - put some remaining recording specific things into an
 '\opt{recording}' so that they are not mentioned in manuals of non-recording
 devices.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16872 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index 03ec1562e5..6ff3642a6f 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -133,9 +133,11 @@ your WPS (While Playing Screen).
   \item [The clip indicator:]
     This is a little black block that is displayed at the very right of the
     scale when an overflow occurs. It usually does not show up during normal
-    playback unless you play an audio file that is distorted heavily. If you
-    encounter clipping while recording, your recording will sound distorted. You
-    should lower the gain. 
+    playback unless you play an audio file that is distorted heavily.
+    \opt{recording}{
+      If you encounter clipping while recording, your recording will sound distorted.
+      You should lower the gain.
+    }
     \note{Note that the clip detection is not very precise.
      Clipping might occur without being indicated.}
   \item [The scale:]
-- 
cgit v1.2.3

