From 265621729b4bb9b99a1f3e250330f91b672350db Mon Sep 17 00:00:00 2001
From: Robert Kukla <roolku@rockbox.org>
Date: Tue, 18 Mar 2008 16:02:41 +0000
Subject: m:robe 100 manual work - it is now in a state comparable to the
 gigabeat one

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16695 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index a775360d3f..478bdeae8f 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -104,7 +104,7 @@ your WPS (While Playing Screen).
       \opt{PLAYER_PAD,RECORDER_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IRIVER_H10_PAD}{%
         \ActionWpsIdThreeScreen & Enter \setting{ID3 Viewer}.\\%
       }%
-      \opt{h1xx,h300,e200,gigabeat,h10,h10_5gb,RECORDER_PAD}{%
+      \opt{h1xx,h300,e200,gigabeat,h10,h10_5gb,RECORDER_PAD,MROBE100_PAD}{%
         \ActionWpsAbSetBNextDir & Skip to the next directory.\\%
         \ActionWpsAbSetAPrevDir & Skip to the previous directory.\\%
       }%
-- 
cgit v1.2.3

