From 1248e9c6de7687ee7bb76e43dcebac2e0575ecc7 Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 20:38:21 +0000
Subject: More work on consistent usage of units in the manual. Use
 non-breaking spaces if applicable.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25649 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index 0466e6e006..65c7cfd560 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -203,8 +203,8 @@ your WPS (While Playing Screen).
     Between the indicators of the right and left channel there are little dots.
     These dots represent important volume values. In linear mode each dot is a
     10\% mark. In dBFS mode the dots represent the following values (from right
-    to left): 0 dB, {}-3 dB, {}-6 dB, {}-9 dB, {}-12 dB, {}-18 dB, {}-24 dB, {}-30 dB,
-    {}-40 dB, {}-50 dB, {}-60 dB.
+    to left): 0~dB, {}-3~dB, {}-6~dB, {}-9~dB, {}-12~dB, {}-18~dB, {}-24~dB, {}-30~dB,
+    {}-40~dB, {}-50~dB, {}-60~dB.
   \end{description}
 }
 \subsection{\label{sec:contextmenu}The WPS Context Menu}
-- 
cgit v1.2.3

