From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/tagcache.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/tagcache.tex')

diff --git a/manual/rockbox_interface/tagcache.tex b/manual/rockbox_interface/tagcache.tex
index c489eb65ee..56481dd5cf 100644
--- a/manual/rockbox_interface/tagcache.tex
+++ b/manual/rockbox_interface/tagcache.tex
@@ -108,7 +108,7 @@ $\rightarrow$ System $\rightarrow$ Limits}) in order to view long lists of
 tracks in the ID3 database browser.\\
 
 There is no option to turn off database completely. If you do not want
-to use it just don't do the initial build of the database and do not load it
+to use it just do not do the initial build of the database and do not load it
 to RAM.}
 %
 \begin{table}
-- 
cgit v1.2.3

