From 3a80fa063e5f42b077bdfc34acad74d3f82c14fc Mon Sep 17 00:00:00 2001
From: Zakk Roberts <midk@rockbox.org>
Date: Sat, 3 Jun 2006 03:56:45 +0000
Subject: Moved TagCache menu entry into the File View section of the manual
 where it was recently moved to in Rockbox itself, and update any descriptions
 to match.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10034 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/tagcache.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/rockbox_interface/tagcache.tex')

diff --git a/manual/rockbox_interface/tagcache.tex b/manual/rockbox_interface/tagcache.tex
index e22d4b3a9f..dcfb39ef35 100644
--- a/manual/rockbox_interface/tagcache.tex
+++ b/manual/rockbox_interface/tagcache.tex
@@ -14,14 +14,14 @@ create the database from your music files. This typically takes around
 this is happenning. You can even shut down your player and resume the 
 database building process next time you turn it on.
 To force the initial database to be built, go to the main menu, then 
-\setting{General Settings $\rightarrow$ Playback $\rightarrow$ Force tag cache update}.
+\setting{General Settings $\rightarrow$ File View $\rightarrow$ Force tag cache update}.
 
 The Tag Cache database can either be kept on disk (to save memory), or 
 loaded into RAM (for fast browsing). This configuration option can be 
-found in \setting{General Settings $\rightarrow$ Playback $\rightarrow$ Tag cache}.
+found in \setting{General Settings $\rightarrow$ File View $\rightarrow$ Tag cache}.
 Once the database has been built, you can browse your music using this 
 database. To use the database change the show mode by changing the 
-\setting{General Settings $\rightarrow$ File view $\rightarrow$ Show files} option to 
+\setting{General Settings $\rightarrow$ File View $\rightarrow$ Show files} option to 
 \setting{ID3 database}. This disables the File Browser and instead of the file
 browser you will now access the database.
 %
-- 
cgit v1.2.3

