From ca673d7e9fe2cf06fa9cabf026354a2ba0e73c6f Mon Sep 17 00:00:00 2001
From: Franklin Wei <franklin@rockbox.org>
Date: Sun, 28 Jun 2020 00:08:42 -0400
Subject: Partially revert the last commit.

The \if->\If replacement is a bit premature for texlive-2019, apparently.

Change-Id: Iab198c2f5e2f00ecdf7e2431e2b77c423e6afc07
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index cbd24ea085..f11246f162 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -5,7 +5,7 @@
 
 % include the front image. Using \specimg makes this fairly easy,
 % but requires to use the exact value of \specimg in the filename!
-% The extension is selected in the preamble, so no further \Ifpdfoutput
+% The extension is selected in the preamble, so no further \ifpdfoutput
 % is necessary.
 %
 % The check looks for a png file -- we use png for the HTML manual, so that
-- 
cgit v1.2.3

