From 82fd72f790b5768775ee66dbdc2e364e5bf595e1 Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sat, 19 May 2007 21:35:09 +0000
Subject: Found one more typo.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@13433 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index 670078af5a..b5b8929fcd 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -178,7 +178,7 @@ paragraph.
   
   On the right hand side of the \dap{} from top to bottom, first there is a two 
   way switch.  the \ButtonPower{} button is activated by pushing this switch up,
-  and pusing this switch down until it clicks slightly will activate the 
+  and pushing this switch down until it clicks slightly will activate the 
   \ButtonHold{} button.  When the switch is in this position, none of the other
   keys will have an effect.
   
-- 
cgit v1.2.3

