From 5f2618c363467648d96ccbc82e14df7d2194a148 Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sun, 20 May 2012 18:08:30 +0200
Subject: Manual: Include the iaudio remote graphic in its manual again.

Commit bb24ac8c27af4ea8459e622a9ea2619aebc50efb replaced the
\opt{iaudiom3,iriverh100} with \opt{remote} which isn't true in the
Iaudio M3 case as this feature is dependent on HAVE_REMOTE_LCD and
the M3 uses this screen as main lcd so doesn't define it. Use the manual
HAVEREMOTEKEYMAP for now as I didn't find a suitable other define yet.

Change-Id: I58b2abd2f7cae1a821cea297a2b4c002a3420493
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index b7c553bf30..cf450acce9 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -22,7 +22,7 @@
     \typeout{Warning: missing front image}
    }
 \end{center}
-\opt{remote}{
+\opt{HAVEREMOTEKEYMAP}{
   % spacing between the two pictures, could possibly be improved
   \begin{center}
   \IfFileExists{rockbox_interface/images/\specimg-remote.png}
-- 
cgit v1.2.3

