From 38c313557e8fa404f8f07cea6a73e24496e728d4 Mon Sep 17 00:00:00 2001
From: Robert Menes <rmenes@rockbox.org>
Date: Sat, 27 Mar 2010 05:11:03 +0000
Subject: Add blind description for the clipv2 to the manual.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25348 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index 92ecb6850a..1c2708fe2a 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -387,7 +387,7 @@ detail in the following paragraph.
   \ButtonHold{} switch is on, none of the other buttons have any effect.
   }
   %
-  \opt{clip}{
+  \opt{clip,clipv2}{
   Hold the \dap{} with the controls on the bottom and the screen on the top. The main
   controls are a four-way pad with a button in the centre; pressing this centre button
   functions as \ButtonSelect{}. Going clockwise from the top, the four-way pad contains
-- 
cgit v1.2.3

