From 12eb058bb065e9cb85949ec3a66c453ac5e1b883 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sun, 23 Mar 2008 22:07:09 +0000
Subject: Make more use of the 'features' system in the manuals (committed in
 r16304), less stuff to keep in sync manually but keep in mind that changes in
 config-*.h can now affect the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16765 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index 3247bcbcc5..65813cbb61 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -118,7 +118,7 @@ paragraph.
 
   On the curved top it has the headphone jack to the left,
   the \ButtonOff{} button is in the middle%
-  \opt{HAVE_RECORDING}{ and the line in jack to the right}.
+  \opt{recording}{ and the line in jack to the right}.
   Apart from the already mentioned MMC slot you will find the USB connector on
   the \daps{} right side. Placed on the upper side of the device right below
   the flat display there is the main button pad of the \dap{}. A strong deepening
-- 
cgit v1.2.3

