From 0d824d2b59c0b0e8cdf2e610ed59a286cef167ea Mon Sep 17 00:00:00 2001
From: Szymon Dziok <b0hoon@o2.pl>
Date: Mon, 19 Apr 2010 21:28:54 +0000
Subject: Packard Bell Vibe: Manual - change the names of the buttons
 internally (ButtonPrev -> ButtonLeft, ButtonNext -> ButtonRight), remove
 unnecessary strings, join the target to the existing mappings, where it's
 needed.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25683 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/rockbox_interface/main.tex')

diff --git a/manual/rockbox_interface/main.tex b/manual/rockbox_interface/main.tex
index bd1d2b5f91..0acb5ad253 100644
--- a/manual/rockbox_interface/main.tex
+++ b/manual/rockbox_interface/main.tex
@@ -408,7 +408,7 @@ detail in the following paragraph.
   \opt{vibe500}{
   Hold or lay the \dap{} so that the side with the controls and
   LCD is facing towards you. Below the LCD is the touch sensitive pad with the \ButtonMenu{}, 
-  \ButtonPlay{}, \ButtonPrev{}, \ButtonNext{} controls and the scroll pad in the centre. The 
+  \ButtonPlay{}, \ButtonLeft{}, \ButtonRight{} controls and the scroll pad in the centre. The 
   scroll pad is oriented vertically and it is between the \ButtonOK{} and \ButtonCancel{} buttons.
   Sliding the finger between these buttons down or up acts as \ButtonDown{} or \ButtonUp{}
   action respectively. Note that the scroll pad is sensitive, so you will need to move 
-- 
cgit v1.2.3

