From 01bcd2c6121fa0ae1797ef11c02be298574f4fdb Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Sat, 20 Jun 2009 19:20:13 +0000
Subject: The define is remote_keymap - good place for a typo that.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@21412 a1c6a512-1295-4272-9138-f99709370657
---
 manual/preamble.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/preamble.tex')

diff --git a/manual/preamble.tex b/manual/preamble.tex
index 0e22b1c8bb..d54a81f16f 100644
--- a/manual/preamble.tex
+++ b/manual/preamble.tex
@@ -312,7 +312,7 @@
 % Cheers for the usenet helping me building this up :)
 
 % btnmap is set to be either two or three columns wide depending on whether
-% remote_kaymap is defined in the platform file for the target in question.
+% remote_keymap is defined in the platform file for the target in question.
 % If it is, then every button table needs to have three columns of the form
 % Main Unit Key  &  Remote Key  &  Description \\
 % or the manual will fail to build.  For some reason, it doesn't seem possible
-- 
cgit v1.2.3

