From fe730d3a2848c84a34ae81d01a2918fe8ebe703f Mon Sep 17 00:00:00 2001
From: Sebastian Leonhardt <sebastian.leonhardt@web.de>
Date: Mon, 15 Aug 2016 23:56:53 +0200
Subject: manual: fix/remove broken links

Change-Id: Ic6a53490b91c891e53feba3804957b0dffcfc074
---
 manual/plugins/zxbox.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/plugins/zxbox.tex')

diff --git a/manual/plugins/zxbox.tex b/manual/plugins/zxbox.tex
index 1d42febea4..b19fc8e302 100644
--- a/manual/plugins/zxbox.tex
+++ b/manual/plugins/zxbox.tex
@@ -1,8 +1,8 @@
 \subsection{\label{ref:ZXBox}ZXBox}
 \screenshot{plugins/images/ss-zxbox}{ZXBox}{img:zxbox}
 ZXBox is a port of the ``Spectemu'' ZX Spectrum 48k emulator for Rockbox
-(\Pointinghand\href{http://kempelen.iit.bme.hu/~mszeredi/spectemu/spectemu.html}
-{project's homepage}). To start a game open a tape file or snapshot saved as
+(\url{https://sourceforge.net/projects/spectemu/}).
+To start a game open a tape file or snapshot saved as
 \fname{.tap}, \fname{.tzx}, \fname{.z80} or \fname{.sna} in the file browser.\\
 \note{As ZXBox is a 48k emulator only loading of 48k z80 snapshots is possible.}
 
-- 
cgit v1.2.3

