From a9f20862a7ffba8b83ef262048022179aa3a34fd Mon Sep 17 00:00:00 2001
From: Jean-Louis Biasini <jlbiasini@gmail.com>
Date: Wed, 17 Jul 2013 19:43:33 +0300
Subject: [Fuze+][Keymaps] Application and viewer keymaps update

Last core update for keymaps and manual. Manual is now 100% complete

Change-Id: I9ad33206ecea41a88cba7a355da911fa7ab0455d
Reviewed-on: http://gerrit.rockbox.org/521
Reviewed-by: Amaury Pouly <amaury.pouly@gmail.com>
---
 manual/plugins/vumeter.tex | 9 +++++----
 1 file changed, 5 insertions(+), 4 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index 059386a7e1..acb68782ab 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -15,7 +15,7 @@ and the meter scale can be changed.
 \opt{IAUDIO_X5_PAD,IRIVER_H10_PAD,SANSA_E200_PAD,SANSA_C200_PAD,SANSA_CLIP_PAD,GIGABEAT_PAD%
      ,MROBE100_PAD,COWON_D2_PAD}{\ButtonPower}
 \opt{SANSA_FUZE_PAD}{Long \ButtonHome}
-\opt{GIGABEAT_S_PAD}{\ButtonBack}
+\opt{GIGABEAT_S_PAD,SANSA_FUZEPLUS_PAD}{\ButtonBack}
 \opt{PBELL_VIBE500_PAD}{\ButtonRec}
 \opt{MPIO_HD200_PAD}{\ButtonRec + \ButtonPlay}
 \opt{MPIO_HD300_PAD}{Long \ButtonMenu}
@@ -26,7 +26,7 @@ and the meter scale can be changed.
 \opt{RECORDER_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD}{\ButtonOn}
 \opt{ONDIO_PAD}{\ButtonMenu}
 \opt{IPOD_4G_PAD,IPOD_3G_PAD,IAUDIO_X5_PAD,IRIVER_H10_PAD,PBELL_VIBE500_PAD%
-    ,MPIO_HD200_PAD,MPIO_HD300_PAD}{\ButtonPlay}
+    ,MPIO_HD200_PAD,MPIO_HD300_PAD,SANSA_FUZEPLUS_PAD}{\ButtonPlay}
 \opt{SANSA_E200_PAD,SANSA_C200_PAD}{\ButtonRec}
 \opt{SANSA_CLIP_PAD}{\ButtonHome}
 \opt{SANSA_FUZE_PAD}{Long \ButtonSelect}
@@ -40,6 +40,7 @@ and the meter scale can be changed.
 \opt{ONDIO_PAD}{Long \ButtonMenu}
 \opt{IRIVER_H100_PAD,IRIVER_H300_PAD,IPOD_4G_PAD,IPOD_3G_PAD,IAUDIO_X5_PAD%
      ,SANSA_E200_PAD,SANSA_FUZE_PAD,SANSA_C200_PAD,SANSA_CLIP_PAD}{\ButtonSelect}
+\opt{SANSA_FUZEPLUS_PAD}{Long \ButtonSelect}
 \opt{IRIVER_H10_PAD}{\ButtonRew}
 \opt{GIGABEAT_PAD,GIGABEAT_S_PAD,MROBE100_PAD,COWON_D2_PAD,PBELL_VIBE500_PAD%
     ,MPIO_HD300_PAD}{\ButtonMenu}
@@ -49,7 +50,7 @@ and the meter scale can be changed.
 \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD%
      ,GIGABEAT_PAD,GIGABEAT_S_PAD,MROBE100_PAD,PBELL_VIBE500_PAD}{\ButtonUp}
 \opt{IPOD_4G_PAD,IPOD_3G_PAD,SANSA_E200_PAD,SANSA_FUZE_PAD}{\ButtonScrollFwd}
-\opt{SANSA_C200_PAD,SANSA_CLIP_PAD,MPIO_HD200_PAD}{\ButtonVolUp}
+\opt{SANSA_C200_PAD,SANSA_CLIP_PAD,MPIO_HD200_PAD,SANSA_FUZEPLUS_PAD}{\ButtonVolUp}
 \opt{IRIVER_H10_PAD,MPIO_HD300_PAD}{\ButtonScrollUp}
 \opt{COWON_D2_PAD}{\TouchTopMiddle}
   \opt{HAVEREMOTEKEYMAP}{& }
@@ -57,7 +58,7 @@ and the meter scale can be changed.
 \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD%
      ,GIGABEAT_PAD,GIGABEAT_S_PAD,MROBE100_PAD,PBELL_VIBE500_PAD}{\ButtonDown}
 \opt{IPOD_4G_PAD,IPOD_3G_PAD,SANSA_E200_PAD,SANSA_FUZE_PAD}{\ButtonScrollBack}
-\opt{SANSA_C200_PAD,SANSA_CLIP_PAD,MPIO_HD200_PAD}{\ButtonVolDown}
+\opt{SANSA_C200_PAD,SANSA_CLIP_PAD,MPIO_HD200_PAD,SANSA_FUZEPLUS_PAD}{\ButtonVolDown}
 \opt{IRIVER_H10_PAD,MPIO_HD300_PAD}{\ButtonScrollDown}
 \opt{COWON_D2_PAD}{\TouchBottomMiddle}
   \opt{HAVEREMOTEKEYMAP}{& }
-- 
cgit v1.2.3

