From a507bb283782ee3adb1fc9ba0c6f094108ef558c Mon Sep 17 00:00:00 2001
From: Sebastian Leonhardt <sebastian.leonhardt@web.de>
Date: Mon, 20 Jul 2015 01:50:26 +0200
Subject: YH8xx,YH9xx: Keymap improvement

The main "innovation" in this patch are two "virtual buttons"
for the record switch on YH92x targets. When the switch state
changes, a single BUTTON_REC_SW_ON or .._OFF button event will
be generated. Thus keymap code can react on switching, but
not on the actual state of the switch.

Wherever sensible, the following user scheme is applied:
- use PLAY as confirm button
- use REW button or Long REW to exit
- use REC (YH820) or FFWD (YH92X) as modifier key for button combos

Change-Id: Ic8d1db9cc6869daed8dda98990dfdf7f6fd5d5a1
---
 manual/plugins/vumeter.tex | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index 2d986824a7..22d5bcc2d5 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -16,7 +16,8 @@ and the meter scale can be changed.
      ,MROBE100_PAD,COWON_D2_PAD}{\ButtonPower}
 \opt{SANSA_FUZE_PAD}{Long \ButtonHome}
 \opt{GIGABEAT_S_PAD,SANSA_FUZEPLUS_PAD}{\ButtonBack}
-\opt{PBELL_VIBE500_PAD,SAMSUNG_YH92X_PAD,SAMSUNG_YH820_PAD}{\ButtonRec}
+\opt{PBELL_VIBE500_PAD}{\ButtonRec}
+\opt{SAMSUNG_YH92X_PAD,SAMSUNG_YH820_PAD}{\ButtonRew}
 \opt{MPIO_HD200_PAD}{\ButtonRec + \ButtonPlay}
 \opt{MPIO_HD300_PAD}{Long \ButtonMenu}
   \opt{HAVEREMOTEKEYMAP}{&
@@ -42,7 +43,8 @@ and the meter scale can be changed.
 \opt{IRIVER_H100_PAD,IRIVER_H300_PAD,IPOD_4G_PAD,IPOD_3G_PAD,IAUDIO_X5_PAD%
      ,SANSA_E200_PAD,SANSA_FUZE_PAD,SANSA_C200_PAD,SANSA_CLIP_PAD}{\ButtonSelect}
 \opt{SANSA_FUZEPLUS_PAD}{Long \ButtonSelect}
-\opt{IRIVER_H10_PAD,SAMSUNG_YH92X_PAD,SAMSUNG_YH820_PAD}{\ButtonRew}
+\opt{IRIVER_H10_PAD}{\ButtonRew}
+\opt{SAMSUNG_YH92X_PAD,SAMSUNG_YH820_PAD}{\ButtonLeft}
 \opt{GIGABEAT_PAD,GIGABEAT_S_PAD,MROBE100_PAD,COWON_D2_PAD,PBELL_VIBE500_PAD%
     ,MPIO_HD300_PAD}{\ButtonMenu}
 \opt{MPIO_HD200_PAD}{\ButtonFunc}
-- 
cgit v1.2.3

