From 97365803d390e44155fc41657bd03a7b121956aa Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Thu, 20 May 2010 17:38:38 +0000
Subject: Get rid of unnecessary 'table' environment and the never used
 parameters for button maps (FS#11088)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26201 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/vumeter.tex | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index 23c785ebfd..a29d88f44b 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -9,8 +9,7 @@ of small meters in addition to the main display (as above).  From the
 settings menu the decay time for the meter (its memory), the meter type
 and the meter scale can be changed.
 
-\begin{table}
-\begin{btnmap}{}{}
+\begin{btnmap}
 \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD}{\ButtonOff}
 \opt{IPOD_4G_PAD,IPOD_3G_PAD}{\ButtonMenu}
 \opt{IAUDIO_X5_PAD,IRIVER_H10_PAD,SANSA_E200_PAD,SANSA_C200_PAD,GIGABEAT_PAD%
@@ -60,4 +59,3 @@ and the meter scale can be changed.
   \opt{HAVEREMOTEKEYMAP}{& }
     & Lower Volume\\
 \end{btnmap}
-\end{table}
-- 
cgit v1.2.3

