From 8c177221b31d9b86aa286092ede463a1c5f0a4b4 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Mon, 3 Apr 2006 22:45:01 +0000
Subject: Added environment to unify button mapping tables. Adjust plugins to
 use it.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9475 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/vumeter.tex | 11 ++++-------
 1 file changed, 4 insertions(+), 7 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index fe07180ecd..aedbb348d5 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -9,10 +9,8 @@ of small meters in addition to the main display (as above).  From the
 settings menu the decay time for the meter (its memory), the meter type
 and the meter scale can be changed. 
 
-\begin{table}[h!]
-\begin{center}
-\begin{tabular}{@{}ll@{}}\toprule
-\textbf{Key} & \textbf{Action} \\\midrule
+\begin{table}
+\begin{btnmap}{}{}
 \opt{recorder,recorderv2fm}{OFF}\opt{ondio}{ON/OFF}
 \opt{h1xx,h300}{Stop}\opt{ipodcolor,ipodnano}{Unknown} 
 & Save settings and quit \\
@@ -23,8 +21,7 @@ and the meter scale can be changed.
 \opt{h1xx,h300,ipodcolor,ipodnano}{Unknown} 
 & Settings \\
 UP & Raise Volume \\
-DOWN & Lower Volume \\\bottomrule
-\end{tabular}
-\end{center}
+DOWN & Lower Volume \\
+\end{btnmap}
 \end{table}
 
-- 
cgit v1.2.3

