From 51f937c2e445eaef345d3a9d15782436bb5e5c27 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Tue, 29 Jan 2008 17:15:01 +0000
Subject: Commit FS#8527 by Thomas Martiz, renaming the wheel macros for sansa
 e200 to be consistent with ipods and the code and some minor fixes/tweaks

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16182 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/vumeter.tex | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index 29ddcd2dd9..94e238ea69 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -30,15 +30,13 @@ and the meter scale can be changed.
     & Settings\\
 \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD,GIGABEAT_PAD}
     {\ButtonUp}
-\opt{IPOD_4G_PAD,IPOD_3G_PAD}{\ButtonScrollFwd}
-\opt{SANSA_E200_PAD}{\ButtonScrollDown}
+\opt{IPOD_4G_PAD,IPOD_3G_PAD,SANSA_E200_PAD}{\ButtonScrollFwd}
 \opt{SANSA_C200_PAD}{\ButtonVolUp}
 \opt{IRIVER_H10_PAD}{\ButtonScrollUp}
     & Raise Volume\\
 \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD,GIGABEAT_PAD}
     {\ButtonDown}
-\opt{IPOD_4G_PAD,IPOD_3G_PAD}{\ButtonScrollBack}
-\opt{SANSA_E200_PAD}{\ButtonScrollUp}
+\opt{IPOD_4G_PAD,IPOD_3G_PAD,SANSA_E200_PAD}{\ButtonScrollBack}
 \opt{SANSA_C200_PAD}{\ButtonVolDown}
 \opt{IRIVER_H10_PAD}{\ButtonScrollDown}
     & Lower Volume\\
-- 
cgit v1.2.3

