From 2cf5abb971546df4ebaa2f132688eca44d520959 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Sun, 2 Apr 2006 17:29:44 +0000
Subject: another enhancement of \screenshot -- filenames should now not
 include the display size extension anymore. Old behaviour still supported.
 Minor code policing.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9432 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/vumeter.tex | 14 ++++++++++----
 1 file changed, 10 insertions(+), 4 deletions(-)

(limited to 'manual/plugins/vumeter.tex')

diff --git a/manual/plugins/vumeter.tex b/manual/plugins/vumeter.tex
index 812ee6f8a7..fe07180ecd 100644
--- a/manual/plugins/vumeter.tex
+++ b/manual/plugins/vumeter.tex
@@ -1,5 +1,5 @@
 \subsection{VU meter}
-\screenshot{plugins/images/ss-vumeter-\genericimg.png}{VU-Meter}{}
+\screenshot{plugins/images/ss-vumeter}{VU-Meter}{}
 
 This is a VU meter, which displays the volume of the left and right
 audio channels. There are 3 types of meter selectable.  The analogue
@@ -13,9 +13,15 @@ and the meter scale can be changed.
 \begin{center}
 \begin{tabular}{@{}ll@{}}\toprule
 \textbf{Key} & \textbf{Action} \\\midrule
-\opt{recorder,recorderv2fm}{OFF}\opt{ondio}{ON/OFF}\opt{h1xx,h300}{Stop}\opt{ipodcolor,ipodnano}{Unknown} & Save settings and quit \\
-\opt{recorder,recorderv2fm}{ON}\opt{ondio}{MODE}\opt{h1xx,h300}{Play}\opt{ipodcolor,ipodnano}{Unknown} & Help \\
-\opt{recorder,recorderv2fm}{F1}\opt{ondio}{HOLD MODE}\opt{h1xx,h300,ipodcolor,ipodnano}{Unknown} & Settings \\
+\opt{recorder,recorderv2fm}{OFF}\opt{ondio}{ON/OFF}
+\opt{h1xx,h300}{Stop}\opt{ipodcolor,ipodnano}{Unknown} 
+& Save settings and quit \\
+\opt{recorder,recorderv2fm}{ON}\opt{ondio}{MODE}
+\opt{h1xx,h300}{Play}\opt{ipodcolor,ipodnano}{Unknown} 
+& Help \\
+\opt{recorder,recorderv2fm}{F1}\opt{ondio}{HOLD MODE}
+\opt{h1xx,h300,ipodcolor,ipodnano}{Unknown} 
+& Settings \\
 UP & Raise Volume \\
 DOWN & Lower Volume \\\bottomrule
 \end{tabular}
-- 
cgit v1.2.3

