From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/text_editor.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/text_editor.tex')

diff --git a/manual/plugins/text_editor.tex b/manual/plugins/text_editor.tex
index 3f4d348975..758cd443d6 100644
--- a/manual/plugins/text_editor.tex
+++ b/manual/plugins/text_editor.tex
@@ -16,7 +16,7 @@ the \setting{Virtual Keyboard} (see \reference{sec:virtual_keyboard}).
   \item When finished editing exit the Text Editor. You'll be shown a list of
         save options. 
 \end{itemize}
-\note{When you haven't changed the file the Text Editor will quit immediately.}
+\note{When you have not changed the file the Text Editor will quit immediately.}
 
 \begin{table}
     \begin{btnmap}{}{}
-- 
cgit v1.2.3

