From 1c9e1bc17c3f5f2f78b059a5fd40640740ea3c18 Mon Sep 17 00:00:00 2001
From: Jonathan Gordon <rockbox@jdgordon.info>
Date: Sun, 29 Jun 2008 09:12:24 +0000
Subject: press the targets "stop" button to exit stats after counting if
 finished

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@17870 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/stats.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/stats.tex')

diff --git a/manual/plugins/stats.tex b/manual/plugins/stats.tex
index 8c0b6f43a9..829975714c 100644
--- a/manual/plugins/stats.tex
+++ b/manual/plugins/stats.tex
@@ -10,5 +10,5 @@ Press %
 \opt{IPOD_4G_PAD,IPOD_3G_PAD}{\ButtonMenu}%
 \opt{IAUDIO_X5_PAD,IRIVER_H10_PAD,SANSA_E200_PAD,SANSA_C200_PAD,GIGABEAT_PAD%
     ,MROBE100_PAD}{\ButtonPower} %
-to abort counting and exit the plugin. Press any key to quit after counting
+to abort counting and exit the plugin. Press it again to quit after counting
 has finished.
-- 
cgit v1.2.3

