From f744e2651fc3d8a330d721e1443dc904df51aafd Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Mon, 21 Sep 2009 10:43:22 +0000
Subject: Improvements to the viewers section of the manual (FS#10531 by David
 Kaufmann)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22764 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/ppmviewer.tex | 7 ++++---
 1 file changed, 4 insertions(+), 3 deletions(-)

(limited to 'manual/plugins/ppmviewer.tex')

diff --git a/manual/plugins/ppmviewer.tex b/manual/plugins/ppmviewer.tex
index 7594fafe69..87e8156a9f 100644
--- a/manual/plugins/ppmviewer.tex
+++ b/manual/plugins/ppmviewer.tex
@@ -1,8 +1,9 @@
 % $Id$ %
 \subsection{PPM viewer}
-Open a PPM file in the \setting{File Browser} to view it. PPM viewer exits
-when any button is pressed.\\
+This plugin opens \fname{.ppm} files from the \setting{File Browser}
+to display them. Exit the ppm viewer plugin by pressing any button.
+
+\note{Both ASCII PPM (P3) and raw PPM (P6) files are supported.}
 
-\note{Both ASCII PPM (P3) and raw PPM (P6) files are supported.
 For more information about PPM files, see
 \url{http://netpbm.sourceforge.net/doc/ppm.html}}
-- 
cgit v1.2.3

