From 51743419993ca23bb78d00b195eb2773743aed39 Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Tue, 25 Aug 2009 21:51:55 +0000
Subject: Add gigabeat F/S volume limits to the manual, and a few minor
 formatting changes.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22513 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/ppmviewer.tex | 13 +++++--------
 1 file changed, 5 insertions(+), 8 deletions(-)

(limited to 'manual/plugins/ppmviewer.tex')

diff --git a/manual/plugins/ppmviewer.tex b/manual/plugins/ppmviewer.tex
index 7de2b8ca0f..7594fafe69 100644
--- a/manual/plugins/ppmviewer.tex
+++ b/manual/plugins/ppmviewer.tex
@@ -1,11 +1,8 @@
 % $Id$ %
 \subsection{PPM viewer}
-Open a PPM file in the \setting{File Browser} to view it.
+Open a PPM file in the \setting{File Browser} to view it. PPM viewer exits
+when any button is pressed.\\
 
-ppmviewer exits when any button is pressed.
-
-\note{
-Both ASCII PPM (P3) and raw PPM (P6) files are supported.
-
-For more information about PPM files, see \url{http://netpbm.sourceforge.net/doc/ppm.html}
-}
+\note{Both ASCII PPM (P3) and raw PPM (P6) files are supported.
+For more information about PPM files, see
+\url{http://netpbm.sourceforge.net/doc/ppm.html}}
-- 
cgit v1.2.3

