From 97365803d390e44155fc41657bd03a7b121956aa Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Thu, 20 May 2010 17:38:38 +0000
Subject: Get rid of unnecessary 'table' environment and the never used
 parameters for button maps (FS#11088)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26201 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/oscilloscope.tex | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'manual/plugins/oscilloscope.tex')

diff --git a/manual/plugins/oscilloscope.tex b/manual/plugins/oscilloscope.tex
index d30b2645c1..336716aced 100644
--- a/manual/plugins/oscilloscope.tex
+++ b/manual/plugins/oscilloscope.tex
@@ -11,8 +11,7 @@ being played.
 
 \subsubsection{Keys}
 
-\begin{table}
-  \begin{btnmap}{}{}
+\begin{btnmap}
     \opt{RECORDER_PAD}{\ButtonFOne}
     \opt{ONDIO_PAD,PBELL_VIBE500_PAD}{\ButtonMenu}
     \opt{IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD,SANSA_E200_PAD%
@@ -88,5 +87,4 @@ being played.
           \opt{IRIVER_RC_H100_PAD}{\ButtonRCStop}
         }
     & Exit demo \\
-  \end{btnmap}
-\end{table}
+\end{btnmap}
-- 
cgit v1.2.3

