From 8fdf5aa613c34e4e928e05d2f084a7a71e4894cb Mon Sep 17 00:00:00 2001
From: Michael DiFebbo <medifebbo@rockbox.org>
Date: Sun, 4 Jun 2006 12:46:13 +0000
Subject: Various corrections to the manual as noted in comment 1 to bug report
 5480.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10045 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/oscilloscope.tex | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'manual/plugins/oscilloscope.tex')

diff --git a/manual/plugins/oscilloscope.tex b/manual/plugins/oscilloscope.tex
index 8c4b675729..166bd84fc5 100644
--- a/manual/plugins/oscilloscope.tex
+++ b/manual/plugins/oscilloscope.tex
@@ -2,8 +2,11 @@
 \screenshot{plugins/images/ss-oscilloscope}{Oscilloscope}{img:oscilloscope}
 
 This demo shows the shape of the sound samples that make up the music
-being played. At faster speed rates, the Jukebox is less responsive
-to user input and music may start to skip.
+being played.
+\opt{SWCODEC}{
+  At faster speed rates, the Jukebox is less responsive
+  to user input and music may start to skip.
+}
 
 \subsubsection{Keys}
 
-- 
cgit v1.2.3

