From 4f2d52e7fe3c5074e7cc025e7d5d1c24f5de920a Mon Sep 17 00:00:00 2001
From: Jean-Louis Biasini <jlbiasini@gmail.com>
Date: Thu, 14 Feb 2013 16:22:14 +0200
Subject: [Fuze+][Manual] Fix compilation broken on oscilloscope

thanks to pixelma for having pointed this out and
correcting the first patch

Change-Id: I79f6264a5290906b0d7abd1703df79fde104cb4a
Reviewed-on: http://gerrit.rockbox.org/405
Reviewed-by: Amaury Pouly <amaury.pouly@gmail.com>
---
 manual/plugins/oscilloscope.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/plugins/oscilloscope.tex')

diff --git a/manual/plugins/oscilloscope.tex b/manual/plugins/oscilloscope.tex
index a79331aa30..710c62a757 100644
--- a/manual/plugins/oscilloscope.tex
+++ b/manual/plugins/oscilloscope.tex
@@ -35,7 +35,8 @@ being played.
     \opt{SANSA_FUZE_PAD}{\ButtonSelect+\ButtonRight}
     \opt{GIGABEAT_S_PAD}{\ButtonNext}
     \opt{COWON_D2_PAD}{\TouchBottomMiddle}
-    \opt{PBELL_VIBE500_PAD,SANSA_FUZEPLUS_PAD}{\ButtonCancel}
+    \opt{PBELL_VIBE500_PAD}{\ButtonCancel}
+    \opt{SANSA_FUZEPLUS_PAD}{\ButtonBack}
     \opt{MPIO_HD200_PAD,MPIO_HD300_PAD}{\ButtonRec}
        \opt{HAVEREMOTEKEYMAP}{& }
     & Toggle whether to scroll or not \\
-- 
cgit v1.2.3

