From 45098bd73f7f04cea9e9e7cb86561c7b15741e78 Mon Sep 17 00:00:00 2001
From: Torne Wuff <torne@wolfpuppy.org.uk>
Date: Thu, 14 Feb 2013 14:02:33 +0000
Subject: Revert "[Fuze+][Manual] Fix compilation broken on oscilloscope"

This reverts commit 200d0c8c0547ada139c2250ce564d3262a1bae39.

The Vibe500 manual was broken by this.
---
 manual/plugins/oscilloscope.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/oscilloscope.tex')

diff --git a/manual/plugins/oscilloscope.tex b/manual/plugins/oscilloscope.tex
index 0531a3e657..a79331aa30 100644
--- a/manual/plugins/oscilloscope.tex
+++ b/manual/plugins/oscilloscope.tex
@@ -35,7 +35,7 @@ being played.
     \opt{SANSA_FUZE_PAD}{\ButtonSelect+\ButtonRight}
     \opt{GIGABEAT_S_PAD}{\ButtonNext}
     \opt{COWON_D2_PAD}{\TouchBottomMiddle}
-    \opt{PBELL_VIBE500_PAD,SANSA_FUZEPLUS_PAD}{\ButtonBack}
+    \opt{PBELL_VIBE500_PAD,SANSA_FUZEPLUS_PAD}{\ButtonCancel}
     \opt{MPIO_HD200_PAD,MPIO_HD300_PAD}{\ButtonRec}
        \opt{HAVEREMOTEKEYMAP}{& }
     & Toggle whether to scroll or not \\
-- 
cgit v1.2.3

