From 12eb058bb065e9cb85949ec3a66c453ac5e1b883 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sun, 23 Mar 2008 22:07:09 +0000
Subject: Make more use of the 'features' system in the manuals (committed in
 r16304), less stuff to keep in sync manually but keep in mind that changes in
 config-*.h can now affect the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16765 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/oscilloscope.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/oscilloscope.tex')

diff --git a/manual/plugins/oscilloscope.tex b/manual/plugins/oscilloscope.tex
index 2167b2f8ea..23e6c81031 100644
--- a/manual/plugins/oscilloscope.tex
+++ b/manual/plugins/oscilloscope.tex
@@ -4,7 +4,7 @@
 
 This demo shows the shape of the sound samples that make up the music
 being played.
-\opt{SWCODEC}{
+\opt{swcodec}{
   At faster speed rates, the \dap\ is less responsive
   to user input and music may start to skip.
 }
-- 
cgit v1.2.3

