From 23d700501d43bc77af75f67553241cc995f0a6f2 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Mon, 6 Mar 2006 13:58:14 +0000
Subject: Added a new \genericimg macro to the platform-files. Added
 screenshots to the cube-plugin as a demonstration of the generic-screenshot
 concept.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@8932 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/oscillograph.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/oscillograph.tex')

diff --git a/manual/plugins/oscillograph.tex b/manual/plugins/oscillograph.tex
index 937a70794d..4dac88898b 100644
--- a/manual/plugins/oscillograph.tex
+++ b/manual/plugins/oscillograph.tex
@@ -15,7 +15,7 @@ At faster speed rates, the Jukebox is less responsive to user input.
 
 \begin{table}[h!]
 \begin{center}
-\begin{tabular}{|c}|c|}
+\begin{tabular}{|c|c|}
 \hline
 KEY & ACTION \\\hline
 F1 & toggles whether to scroll or not \\\hline
-- 
cgit v1.2.3

