From bb059ab78c607aa89f908524ff3df0eadb75730e Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Tue, 8 Sep 2009 20:55:45 +0000
Subject: Manual section for the pitch detector (this is just the beginning)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22667 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/main.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'manual/plugins/main.tex')

diff --git a/manual/plugins/main.tex b/manual/plugins/main.tex
index a737598059..51344123f7 100644
--- a/manual/plugins/main.tex
+++ b/manual/plugins/main.tex
@@ -185,6 +185,8 @@ the associated file. Viewers are stored in the
 
 {\input{plugins/metronome.tex}}
 
+\opt{swcodec}{\opt{recording_mic}{\input{plugins/pitch_detector.tex}}}
+
 {\input{plugins/random_folder_advance_config.tex}}
 
 \opt{lcd_color}{\input{plugins/rockpaint.tex}}
-- 
cgit v1.2.3

