From 85788598acfd3b87253479c7d7a48a3b65b0367f Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Mon, 7 Jul 2008 14:40:41 +0000
Subject: Manual page for the keybox plugin

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@17980 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/main.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'manual/plugins/main.tex')

diff --git a/manual/plugins/main.tex b/manual/plugins/main.tex
index 59eb8be2ed..3838c2e91b 100644
--- a/manual/plugins/main.tex
+++ b/manual/plugins/main.tex
@@ -159,6 +159,8 @@ the associated file. Viewers are stored in the
 
 \opt{recorder,recorderv2fm,ondio}{\input{plugins/firmware_flash.tex}}
 
+{\input{plugins/keybox.tex}}
+
 \opt{HAVE_BACKLIGHT}{\input{plugins/lamp.tex}}
 
 {\input{plugins/md5sum.tex}}
-- 
cgit v1.2.3

