From 84dbc76522c181a65d354acd9aa9d83d861f1ff5 Mon Sep 17 00:00:00 2001
From: Marc Guay <marcguay@rockbox.org>
Date: Mon, 30 Jun 2008 01:43:26 +0000
Subject: Add md5sum plugin to the manual.  Closes FS#9108 and ignores the
 possible bug I mention; it can be opened as a bug report if anyone else
 confirms it.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@17887 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/main.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'manual/plugins/main.tex')

diff --git a/manual/plugins/main.tex b/manual/plugins/main.tex
index 0b0427724a..177d4c7fe7 100644
--- a/manual/plugins/main.tex
+++ b/manual/plugins/main.tex
@@ -157,6 +157,8 @@ the associated file. Viewers are stored in the
 
 \opt{HAVE_BACKLIGHT}{\input{plugins/lamp.tex}}
 
+{\input{plugins/md5sum.tex}}
+
 {\input{plugins/metronome.tex}}
 
 {\input{plugins/random_folder_advance_config.tex}}
-- 
cgit v1.2.3

