From 51743419993ca23bb78d00b195eb2773743aed39 Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Tue, 25 Aug 2009 21:51:55 +0000
Subject: Add gigabeat F/S volume limits to the manual, and a few minor
 formatting changes.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22513 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/main.tex')

diff --git a/manual/plugins/main.tex b/manual/plugins/main.tex
index 1a57fc96ef..a737598059 100644
--- a/manual/plugins/main.tex
+++ b/manual/plugins/main.tex
@@ -6,7 +6,7 @@ This means you cannot switch back and forth between a plugin and Rockbox. When
 a plugin is loaded, you need to exit it to return to the Rockbox interface.
 Most plugins will not interfere with music playback but some of them will stop
 playback while running. Plugins have the file extension \fname{.rock}. Most of
-them can be started from \setting{Browse Plugins} in the \setting{Main Menu}.
+them can be started from \setting{Browse Plugins} in the \setting{Main Menu}.\\
 
 Viewer plugins get started automatically by opening an associated file (i.e.
 text files%
-- 
cgit v1.2.3

