From 41ff287e07d555f5f667812003dcf2f8fd86eec3 Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Sun, 28 Jun 2009 18:02:04 +0000
Subject: Add remote keymapping to the manual for the iriver H100.  Plugins
 have not yet been done and currently just have a blank column.  Most plugins
 only quit via the remote anyway at this point.  Please notify of any
 errors/omissions (I'm sure there are some).

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@21547 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/lamp.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'manual/plugins/lamp.tex')

diff --git a/manual/plugins/lamp.tex b/manual/plugins/lamp.tex
index 39042edd49..52159a7126 100644
--- a/manual/plugins/lamp.tex
+++ b/manual/plugins/lamp.tex
@@ -9,6 +9,7 @@ You get an empty screen with maximum brightness.
     }
     \opt{PLAYER_PAD}{\ButtonMenu}
     \opt{RECORDER_PAD,ONDIO_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD}{\ButtonOff}
+      \opt{IRIVER_RC_H100_PAD}{&} 
     \opt{IPOD_4G_PAD,IPOD_3G_PAD}{Long \ButtonPlay}
     \opt{IRIVER_H10_PAD,IAUDIO_X5_PAD,SANSA_E200_PAD,SANSA_C200_PAD,GIGABEAT_PAD,MROBE100_PAD}{\ButtonPower}
         & Quit\\
-- 
cgit v1.2.3

