From 5c09844d54c7adba80fd261e83a4c895d007a576 Mon Sep 17 00:00:00 2001
From: Teruaki Kawashima <teru@rockbox.org>
Date: Sun, 16 Jan 2011 11:40:47 +0000
Subject: Update manual for image viewer plugin.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@29065 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/imageviewer.tex | 11 ++++++++++-
 1 file changed, 10 insertions(+), 1 deletion(-)

(limited to 'manual/plugins/imageviewer.tex')

diff --git a/manual/plugins/imageviewer.tex b/manual/plugins/imageviewer.tex
index 28ef62e3a6..e3603fa6ce 100644
--- a/manual/plugins/imageviewer.tex
+++ b/manual/plugins/imageviewer.tex
@@ -3,12 +3,15 @@
 This plugin opens image files from the \setting{File Browser} to display them\nopt{lcd_color}{ using Rockbox's greyscale library}. Supported formats are as follows.
 
 \begin{table}
-  \begin{rbtabular}{.60\textwidth}{llX}%
+  \begin{rbtabular}{.60\textwidth}{lX}%
       {\textbf{Format}& \textbf{File-extension(s)}}%
       {}{}
     BMP         & \fname{.bmp}                  \\
     JPEG        & \fname{.jpg, .jpe, .jpeg}     \\
     PNG         & \fname{.png}                  \\
+    \opt{lcd_color}{
+      PPM         & \fname{.ppm}                  \\
+    }
   \end{rbtabular}
 \end{table}
 
@@ -139,4 +142,10 @@ for JPEG images.
 Progressive scan and other unusual JPEG files are not supported, and will
 result in various ``unsupported xx'' messages. Processing could also fail if the
 image is too big to decode which will be explained by a respective message.
+
+\opt{lcd_color}{
+  Supported PPM files are both ASCII PPM (P3) and raw PPM (P6).
+  For more information about PPM files, see
+  \url{http://netpbm.sourceforge.net/doc/ppm.html}
+}
 }
-- 
cgit v1.2.3

