From b2f7c61f84191d3d15606400165efe931bb66d2a Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Fri, 14 Dec 2007 02:03:58 +0000
Subject: Manual: apply FS#8309 by David Bishop (replace all occurences of
 'folder/folders' with 'directory/directories') for consistency. Additionally
 tried to get rid of some unnecessary ones here and there but phrasing can
 definitely be improved further.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@15923 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/doom.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'manual/plugins/doom.tex')

diff --git a/manual/plugins/doom.tex b/manual/plugins/doom.tex
index 8eb5fa3c82..5b53183b95 100644
--- a/manual/plugins/doom.tex
+++ b/manual/plugins/doom.tex
@@ -15,10 +15,9 @@ from prboom-2.2.6
 The needed files can be found at
 \wikilink{PluginDoom}
 
-To play addon wads create the \fname{addons} directory within the doom folder.
+To play addon wads create the \fname{addons} directory within the doom directory.
 Place \fname{wad} files in this directory. Currently doom only supports 
-a maximum number of 10 addons 
-in the directory.
+a maximum number of 10 addons.
 
 A free alternative for Doom 2 is FreeDoom (\url{http://freedoom.sourceforge.net}).
 This can be used in place of \fname{doom2.wad}, or it may be used as an addon in 
-- 
cgit v1.2.3

