From 2cf5abb971546df4ebaa2f132688eca44d520959 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Sun, 2 Apr 2006 17:29:44 +0000
Subject: another enhancement of \screenshot -- filenames should now not
 include the display size extension anymore. Old behaviour still supported.
 Minor code policing.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9432 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/cube.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/cube.tex')

diff --git a/manual/plugins/cube.tex b/manual/plugins/cube.tex
index 12dbb335d2..9c77bdf242 100644
--- a/manual/plugins/cube.tex
+++ b/manual/plugins/cube.tex
@@ -1,5 +1,5 @@
 \subsection{Cube}
-\screenshot{plugins/images/ss-cube-\genericimg.png}{Cube}{img:cube}
+\screenshot{plugins/images/ss-cube}{Cube}{img:cube}
 
 This is a rotating cube screen saver in 3D.
 To see it at full speed, press PLAY and it will run at maximum frame rate. Also you can change the size of the x, y and z axis using  LEFT, RIGHT, UP, DOWN, F1 and F2.
-- 
cgit v1.2.3

