From e42927fa42761b62d05829333566eda9c0d4a3fe Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Wed, 22 Jul 2009 21:49:36 +0000
Subject: Ooops, correct H100 remote button to exit bubbles (manual).

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22001 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/bubbles.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/bubbles.tex')

diff --git a/manual/plugins/bubbles.tex b/manual/plugins/bubbles.tex
index 96d853517b..d46d7e5e58 100644
--- a/manual/plugins/bubbles.tex
+++ b/manual/plugins/bubbles.tex
@@ -48,7 +48,7 @@ fired. Points are awarded depending on how quickly the level was completed.
         ,MROBE100_PAD}{\ButtonPower}
     \opt{GIGABEAT_S_PAD}{\ButtonBack}
        \opt{HAVEREMOTEKEYMAP}{& 
-          \opt{IRIVER_RC_H100_PAD}{\ButtonRCPlay}
+          \opt{IRIVER_RC_H100_PAD}{\ButtonRCStop}
             }
         & Exit to menu\\
     \end{btnmap}
-- 
cgit v1.2.3

