From e8c72b68917b064c6ec7b87d46b4ee59faea7ffb Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Sun, 9 May 2010 18:33:31 +0000
Subject: Use typographic quotation marks -- correct more places

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25917 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/batterybenchmark.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/plugins/batterybenchmark.tex')

diff --git a/manual/plugins/batterybenchmark.tex b/manual/plugins/batterybenchmark.tex
index fb7c64dfa0..98578f701f 100644
--- a/manual/plugins/batterybenchmark.tex
+++ b/manual/plugins/batterybenchmark.tex
@@ -42,9 +42,9 @@ actual battery level. The actual battery level can be seen from the
 again as estimated by Rockbox.
 \item[Voltage] The battery voltage in mV at the moment the measurement
 was taken.
-\item[C] This stands for Charger. An "A" in that column shows if the power
+\item[C] This stands for Charger. An ``A'' in that column shows if the power
 adapter was attached to the unit at the time of the measurement.
-\item[U] USB powered. Only for targets that support this. A "U" will indicate
+\item[U] USB powered. Only for targets that support this. A ``U'' will indicate
 if the unit was using the USB port for power at the time of the measurement. 
 \end{description}
 
-- 
cgit v1.2.3

