From b2f7c61f84191d3d15606400165efe931bb66d2a Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Fri, 14 Dec 2007 02:03:58 +0000
Subject: Manual: apply FS#8309 by David Bishop (replace all occurences of
 'folder/folders' with 'directory/directories') for consistency. Additionally
 tried to get rid of some unnecessary ones here and there but phrasing can
 definitely be improved further.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@15923 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/batterybenchmark.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/batterybenchmark.tex')

diff --git a/manual/plugins/batterybenchmark.tex b/manual/plugins/batterybenchmark.tex
index 35071a9c39..ab7774c2c4 100644
--- a/manual/plugins/batterybenchmark.tex
+++ b/manual/plugins/batterybenchmark.tex
@@ -13,7 +13,7 @@ You can do whatever you could do before loading the plugin except loading
 another plugin. If you happen to load a plugin while benchmarking, a splash
 screen will inform you about the termination of the benchmark.
 While you operate it will log various battery related information every time
-the disk is activated by external causes, (buffer refill, open folder,
+the disk is activated by external causes, (buffer refill, open directory,
 USB mode) or an hour passes without updating the log file.\\
 The plugin will continue to log info until:
 
-- 
cgit v1.2.3

