From 57327044cdfa8258b8bea8a4d837fa4a7d551aff Mon Sep 17 00:00:00 2001
From: Jonas Häggqvist <rasher@rasher.dk>
Date: Sat, 22 Jul 2006 14:02:07 +0000
Subject: Use the \wikilink{} macro instead of \url{} in a number of places.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10284 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/batterybenchmark.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/batterybenchmark.tex')

diff --git a/manual/plugins/batterybenchmark.tex b/manual/plugins/batterybenchmark.tex
index 0e05627287..b416590db1 100755
--- a/manual/plugins/batterybenchmark.tex
+++ b/manual/plugins/batterybenchmark.tex
@@ -5,7 +5,7 @@ background (TSR plugin), reading various info about your battery while you use
 it. Once you finish your session you can find the benchmark output data in a
 file on your \dap\ \fname{/battery\_bench.txt}.
 Please submit your results to the Rockbox wiki.
-\url{http://www.rockbox.org/twiki/bin/view/Main/BatteryRuntime}
+\wikilink{BatteryRuntime}
 
 \subsubsection{How it works}
 After you load the plug-in the operation of your \dap\ continues as normal.
-- 
cgit v1.2.3

