From c7fd0fee7ad2581889e84748ab64e10003d9d526 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Tue, 21 Feb 2006 11:54:53 +0000
Subject: Patch[1430311] by Henrico Witvliet. Split plugins to individual
 files. Proper naming of the targets.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@8763 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/battery_test.tex | 16 ++++++++++++++++
 1 file changed, 16 insertions(+)
 create mode 100644 manual/plugins/battery_test.tex

(limited to 'manual/plugins/battery_test.tex')

diff --git a/manual/plugins/battery_test.tex b/manual/plugins/battery_test.tex
new file mode 100644
index 0000000000..65f48e22ec
--- /dev/null
+++ b/manual/plugins/battery_test.tex
@@ -0,0 +1,16 @@
+\subsection{Battery\_test}
+\begin{figure}[h]
+\begin{center}
+%\includegraphics{plugins/images/\platform/ss_battery_test.png}
+\end{center}
+\caption{Battery Test}
+\end{figure}
+
+This plugin simulates normal power drain by spinning up the disk and
+reading a big file once every 90 seconds (or thereabouts). Each
+spin up also writes the battery level to a
+log file. The test stops when battery level reaches 4\% in order to
+avoid being unable to write to the disk.  The power usage data is saved
+to a file in the root directory of the Jukebox.  This plugin can
+sometimes be useful for diagnosing problems with battery charging.
+
-- 
cgit v1.2.3

