From 14c418bc8bc0c43e07f7b958cafc98c050c199a4 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Sat, 1 Jul 2006 08:58:14 +0000
Subject: Remove battery_test from the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10164 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/battery_test.tex | 11 -----------
 1 file changed, 11 deletions(-)
 delete mode 100644 manual/plugins/battery_test.tex

(limited to 'manual/plugins/battery_test.tex')

diff --git a/manual/plugins/battery_test.tex b/manual/plugins/battery_test.tex
deleted file mode 100644
index 89c9fc8b0c..0000000000
--- a/manual/plugins/battery_test.tex
+++ /dev/null
@@ -1,11 +0,0 @@
-\subsection{Battery\_test}
-\screenshot{plugins/images/ss-battery_test}{Battery Test}%
-{img:batterytest}
-
-This plugin simulates normal power drain by spinning up the disk and
-reading a big file once every 90 seconds (or thereabouts). Each
-spin up also writes the battery level to a
-log file. The test stops when battery level reaches 4\% in order to
-avoid being unable to write to the disk.  The power usage data is saved
-to a file in the root directory of the Jukebox.  This plugin can
-sometimes be useful for diagnosing problems with battery charging.
-- 
cgit v1.2.3

