From 2e865286bc08a25a420355ef93994f594286f764 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Wed, 16 Dec 2009 18:50:25 +0000
Subject: \genericimg should be the generic image, i.e. the resolution. If a
 target specific screenshot exists (using the \specimg value) exists it's used
 automatically. Putting the target specific extension into \genericimg defeats
 the purpose of the fallback system. Fixes clip screenshots.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@24036 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/sansaclip.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/platform/sansaclip.tex')

diff --git a/manual/platform/sansaclip.tex b/manual/platform/sansaclip.tex
index 0509c52eb3..c92f2d286a 100644
--- a/manual/platform/sansaclip.tex
+++ b/manual/platform/sansaclip.tex
@@ -10,7 +10,7 @@
 \newcommand{\playerman}{Sansa}
 \newcommand{\playertype}{Clip}
 \newcommand{\playerlongtype}{\playertype}
-\newcommand{\genericimg}{128x64x1-clip}
+\newcommand{\genericimg}{128x64x1}
 \newcommand{\specimg}{sansaclip}
 %Used to name the player, e.g. ...to the \dap
 \newcommand{\dap}{player}
-- 
cgit v1.2.3

