From 9becb7a085a5bf5878ca1774f20a3aac71d1650a Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sat, 5 Jun 2010 17:29:06 +0000
Subject: Add a mapping for the PLA_EXIT action for Iriver remote and provide
 it in the manual as well.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26591 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/remote-keymap-iriverh100.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/platform/remote-keymap-iriverh100.tex')

diff --git a/manual/platform/remote-keymap-iriverh100.tex b/manual/platform/remote-keymap-iriverh100.tex
index c423f9e500..6a6a99cdea 100644
--- a/manual/platform/remote-keymap-iriverh100.tex
+++ b/manual/platform/remote-keymap-iriverh100.tex
@@ -119,5 +119,6 @@
 \newcommand{\PluginRCLeftRepeat}{Long \ButtonRCVolDown}
 \newcommand{\PluginRCRightRepeat}{Long \ButtonRCVolUp}
 \newcommand{\PluginRCCancel}{\ButtonRCStop}
+\newcommand{\PluginRCExit}{\ButtonRCSelect}
 \newcommand{\PluginRCSelect}{\ButtonRCOn}
-\newcommand{\PluginRCSelectRepeat}{Long \ButtonRCOn}
\ No newline at end of file
+\newcommand{\PluginRCSelectRepeat}{Long \ButtonRCOn}
-- 
cgit v1.2.3

