From a352c62ad0cb16eaae104b713c89b21491e3706a Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sat, 19 May 2007 19:03:39 +0000
Subject: Dealing with the description of flash based vs. hard disk based
 players in the manual. (1) If possible make the phrasing more general. (2)
 Introducing a 'disk' macro in the platform files for further use. Any
 workarounds for this problem should be replaced one by one.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@13419 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/ondiosp.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'manual/platform/ondiosp.tex')

diff --git a/manual/platform/ondiosp.tex b/manual/platform/ondiosp.tex
index e984397ef7..5cb9a61a25 100644
--- a/manual/platform/ondiosp.tex
+++ b/manual/platform/ondiosp.tex
@@ -18,6 +18,7 @@
 \newcommand{\daps}{player's}
 \newcommand{\firmwarefilename}{\fname{ajbrec.ajz}}
 \newcommand{\screenshotsize}{4cm}
+\newcommand{\disk}{flash storage}
 
 \newcommand{\ButtonLeft}{\btnfnt{Left}}
 \newcommand{\ButtonRight}{\btnfnt{Right}}
-- 
cgit v1.2.3

