From 12eb058bb065e9cb85949ec3a66c453ac5e1b883 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sun, 23 Mar 2008 22:07:09 +0000
Subject: Make more use of the 'features' system in the manuals (committed in
 r16304), less stuff to keep in sync manually but keep in mind that changes in
 config-*.h can now affect the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16765 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/ondiosp.tex | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'manual/platform/ondiosp.tex')

diff --git a/manual/platform/ondiosp.tex b/manual/platform/ondiosp.tex
index c07cab2de0..5b15aca1d4 100644
--- a/manual/platform/ondiosp.tex
+++ b/manual/platform/ondiosp.tex
@@ -2,9 +2,6 @@
 %platform file for the Ondio SP
 \def\UseOption{ondiosp}
 \edef\UseOption{\UseOption,ondio}
-\edef\UseOption{\UseOption,HAVE_LCD_BITMAP}
-\edef\UseOption{\UseOption,HAVE_LCD_INVERT}
-\edef\UseOption{\UseOption,HAVE_LCD_FLIP}
 \edef\UseOption{\UseOption,MASCODEC}
 \edef\UseOption{\UseOption,ONDIO_PAD}
 \edef\UseOption{\UseOption,BATTERY_TYPES}
-- 
cgit v1.2.3

